0 5 10 15 20

-0.16

-0.14

-0.12

-0.10

-0.08

-0.06

-0.04

-0.02

-0.04

-0.03

-0.02

-0.01

0.00

0.01

0.02

0 10 20 30 40

Time (min)

�cal/sec

Molar Ratio kcal mol^{-1} of injectant