0 20 40 60 80

-0.05

-0.04

-0.03

-0.02

-0.01

0.00

-0.30

-0.25

-0.20

-0.15

-0.10

-0.05

0.00

0 10 20 30 40

Time (min)

�cal/sec

Molar Ratio kcal mol^{-1} of injectant